Apply to clean, dry skin as often as desired. A little goes a long way, you don't need much of Agent Nateur to keep you smelling luxurious throughout the day. If you have a history of sensitive skin or allergic reactions, please be sure to test body products on a small area inside your wrist for 2-3 days prior to using. If you are sensitive to baking soda, we recommend that you try an apple cider vinegar wash prior to using our deodorant. Apply apple cider vinegar and warm water to a wash towel and pat your underarms before applying our deodorant. This has alleviated the rash and allowed those who are sensitive to continue using natural deodorant that contains baking soda.
Shipping Weight: 4.8 ounces
ASIN: B01N4KQZM2
Average Customer Review: 3.6 out of 5 stars 16 customer reviews
Amazon Best Sellers Rank: #307,861 in Beauty &amp; Personal Care (See Top 100 in Beauty &amp; Personal Care)
Product Warranty: For warranty information about this product