Wake Up Your Taste Buds with Maxwell House Breakfast Blend Coffee - Light, bright and a good start to the day! Our Maxwell House Breakfast Blend ground coffee brews up with a rich and heady aroma. Its light roast and 100% pure coffee bean grind keeps your taste buds wanting more. - Stay Fresh Canister Storage - This fresh and flavorful light roast Breakfast Blend coffee comes in a convenient 25.6 oz canister, so it's easy to reach for it again and again.

Maxwell House Breakfast Blend has a Light and Bright Flavor
100% Arabica Beans. Light Roast
Instructions: Store in a dry place. Safe handling instructions: For Keurig K-Cup brewing systems. Not for Keurig Vue brewing systems
100-count single serve K-CUP PODS
For use in all KEURIG K-CUP brewing systems