316L Stainless Steel Case is the quality standard for a premium watch.
Sapphire Crystal is highly scratch resistant and will protect the face of your watch to aid clarity.
Brown Italian Leather Strap with regular pin buckle feels soft and supple against your skin and will fit perfectly to your wrist.
Japanese Miyota 6P00 Movement keeps precise and accurate time for the life of your timepiece.
Anti-Reflective Coating reduces glare so you can clearly see the watch face under all lighting conditions.
Certificate of Authenticity which will guarantee you own a unique and original timepiece.
50 Meters (5ATM) Water Resistance safely protects your timepiece from contact with water.
Case Diameter: 40mm
Case Thickness: 9mm
STRAP WIDTH: 20 MM, BEST FIT FOR 14 - 23 CM WRIST
CASE MATERIAL: STAINLESS STEEL (316L GRADE)
GLASS: SAPPHIRE GLASS
STRAPS: BROWN ITALIAN LEATHER