The "multi award winning" turntable was designed to deliver superior performance over the same price range. Thanks to high-quality components, excellent assembly quality with high reliability and user-friendliness, RP1's minimalist design is the bridge to create a lively, thrilling music experience for people. use.
The single speed RP78 has been designed and engineered to achieve outstanding performance way beyond the expectations of a product at this price point. Excellent build quality, reliability and ease of use combine to make a product which, if used correctly, will offer you a lifetime of musical enjoyment.
Designed solely for the reproduction of 78 rpm records, we have omitted any unnecessary gimmicks allowing us to concentrate the manufacturing costs on the high quality parts necessary to reproduce records accurately. The minimalist design of the Rega RP78 and the use of extremely high quality components ensure that your turntable should last for many years.
The RB202 offers astonishing performance and is one of Rega's best selling tonearms. An evolution of the famous RB250, which was supplied as standard on the Planar 2 and P2 turntable, the RB202 uses hand selected, high quality vertical and horizontal bearings.
Specifically designed for 78's
Rega RB251 tonearm
Plinth design is of a low mass particulate core sandwiched by highly rigid phenolic laminates
New ultra low vibration state of the art rigid mounted motor assembly borrowed from the P3
RB78 cartridge available separately