If Lips Sofa is the embodiment of gentle serenity, Tomford Sofa is the complementary extremes: strong, solid.
With a convenient 3-seater design suitable for all space areas, CAMI's Tomford Sofa Model - a small house interior will become a different and modern highlight for your home space.
The material of felt fabric combined with natural wooden chair legs of the same color exudes the luxurious style! If your home area is suitable, it will be perfect when combined with Tomford Single Sofa with the same set!

Size: 205 x 84 x 86 cm
Warranty: 3 years wooden frame, 1 year sucking pad
Material: Russian oak frame, imported felt felt
Color: Optional