Olunpo QDT1404 leather men's shade, light, soft, breathable, comfortable to wear, regular thread, meticulous help product is durable beautiful time. The surface is made of light shiny beige leather, breathable for feet.
- The fine line, meticulous artistry for the shoes are always strong.
- The skin in the air 360 degrees, moisture removal, effective in deodorizing, antibacterial.
- Use rubber sole for high elasticity, good friction, anti-slip.
Brand: Olunpo
Material of base: Rubber
Surface Material: Leather
Shoe style:
Pattern: Slippery
Base type: Low base