Genuine Fossil FS5440 watch, stainless steel cover material, high quality leather strap, brick number, sport design, youthful, fashionable green face

Brand: Fossil
Product Code: FS5440
Origin: America
Product Line: Minimalist
Gender: Male
Machine: Japan Quartz (Use battery)
Glass: Hard glass (Mineral crystal)
Material Cord: Genuine leather cord
Material Shell: Stainless steel
Face Diameter: 44 mm
Face Thickness: 8 mm
Color Number: Green