The classic thick 1897 Unisex eyeglass frames with frames and eyeglasses perfectly combined, the classic style combined with the perfect modern style brings an attractive beauty

- Classic thick frame, using high quality plastic material does not harm the skin to bring the safest feeling when using.
- The design glass is suitable for both men and women.
- Integrated nasal cushion does not cause discomfort when worn.

Sex: Male / female
Contact material:
Frame material: High quality plastic
Simple styling, elegant
Size: frame length 135mm