SIM: Nano-SIM
Type: IPS LCD capacitive touchscreen, 16M colors
Size: 5.5 inches, 83.4 cm2 (~69.8% screen-to-body ratio)
Resolution: 720 x 1280 pixels, 16:9 ratio (~267 ppi density)
Protection: Corning Gorilla Glass 3