Standard delivery is available for orders with delivery addresses located in metropolitan France (Corsica included) and Monaco. Please see our full delivery policy for more details.
You have a statutory withdrawal period of fourteen clear days from the date of receipt of your order. Please see our Returns and Exchanges Policy for more details.

Fossil.fr accepts payment by credit card (Visa, Visa Electron, Mastercard and Carte Bleue) or via the PayPal secure payment website. Please consult notrenote on the different payment options for more details.

Collection: Neutra
Movement Type: Automatic Mechanics
Case Size: 44mm
Bracelet Material: Leather
Water resistance: 5 ATM