A beautifully delicate unusual looking accent plant with long soft narrow green leaves adding a touch of elegance in offices, reception areas, shopping centers and showrooms. Sometimes called Medusa or Reflexa longifolia.  An exciting new cultivar of Reflexa characterized by long soft narrow non-variegated leaves which when new are lighter green. Growth is upright to about eight feet.  A native of Madagascar and India. Like most Reflexa, Anita acclimate easily in low light with little water, but will also thrive in high light.  Water when surface has dried down, but is still moist below. Do not let soil go completely dry or stay soggy wet. Typical temperature is 60 to 86 degrees.

6-7 staggered canes topped by slender green leaves with reddish margins, creating a full column of foliage. Generally 6 – 7′ overall height.

Most Dracaenas grow best in bright, indirect light, the leaves will soften and relax in lower light.

Allow to dry slightly between waterings.