Sofa Renault is one of the classic colorful sofa models but still looks luxurious at first sight.

To make a quality product, CAMI's experts carefully calculated every detail of the seat's size, reclining, thickness of the seat cushion ... to reach a sense of safety and convenience for users.
No matter what space it is, CAMI's RENAULT Sofa still exudes a unique and unique elegance.

Size: 207 x 75 x 72 cm
Warranty: 3 years wooden frame, 1 year sucking pad
Material: Russian oak frame, PU leather upholstery
Colors: Black, brown, optional