Casual Casual leather strap with tempered glass surface, not afraid of scratches, waterproof 3ATM, comfortable to wear when washing hands, rain; genuine leather strap imported, luxurious, durable; Fashionable just helps you manage time efficiently
- Casual smooth leather strap with 6mm ultra-thin surface design, imported high-end quartz hard durable.
- Classic surface, displaying a calendar day in a small corner of 3 hours.
- The hour mark combines Roman numerals and simple nail shape, easy to see, delicate.
- Choice of refined steel 316, polished IP technology.
- Soft, breathable, not hypersensitive to wear, embellish the beauty of the gentlemen.
- Waterproof 3ATM allows you to use rain safely, wash your hands, wash your face, ...
Shell material: steel
Strap: leather
Machine type: quartz
Diameter: 40 mm
Thickness: 6 mm
Water resistance: 3 tam
Design: fashion watch round face