Dial Color: White, Case Shape: Round, Dial Glass Material: Scratch Resistant Glass
Band Color: Multi-Colour, Band Material: Fabric
Watch Movement Type: Quartz, Watch Display Type: Analog
Case Material: Stainless Steel, Case Diameter: 44 millimeters
Water Resistance Depth: 50 meters
2 years international warranty

Band Colour: Multi-Colour
Band Material: cloth
Band Width: 22 Millimeters
Brand: Fossil
Case Diameter: 44 Millimeters
Case Material: Stainless Steel
Dial Colour: White