Conrad corner sofa is a classic beautiful retro furniture with exceptionally good seating comfort. The design is simple and delicious with some buttons in the back cushions and angled solid wood legs. The Conrad sofa group gives a 1950's feel and quality feel to the home and consists of armchair, a 3-seater sofa, a 3-seater sofa with chaise longue and a corner sofa with a puff end. Designed by Christian Rudolph.


Hojde80cm
Bredde232cm
Dybde92cm
Seat depth63cm
Inside width188cm
Seat height43cm
LegLeg Type A, Oak, 17cm