<div class="chart-container">
<div class="chart-content">
<div class="chart-content-list">

To choose the correct size for you, measure your body as follows:
<ul>
 	<li><strong>Chest :</strong> Measure around the fullest part, place the tape close under the arms and make sure the tape is flat across the back.</li>
</ul>
</div>
<div class="chart-content-image"><img class="alignnone size-full wp-image-7678" src="http://ocolus.kutethemes.net/wp-content/uploads/2018/11/size-chart.png" alt="" width="270" height="320" /></div>
</div>
</div>