The smart and stylish mens Fossil Grant watch. This watch has a stainless steel round case, clear looking cream dial with stand out Roman numeral hour markers and is complete with chronograph function. It has a brown genuine leather strap and powered by a quality quartz movement.

More accurate than a mechanical movement—this electronic watch movement features a quartz crystal that oscillates when a current is applied to it.
Collection: The Minimalist 3H
Movement Type: Quartz
Case Size: 44mm
Strap Material: Stainless Steel
Water Resistant: 5 ATM