One Cottonelle Mega Roll is equal to four single rolls of the leading ultra 77-ct. toilet paper
Our softest, thickest, most absorbent Cottonelle Toilet Paper
Sewer-safe and septic-safe 2-ply bath tissue with CleanRipple Texture to remove more
Fits standard toilet paper holders without the need for any attachments
Save up to 15% on Cottonelle Ultra ComfortCare Toilet Paper with Subscribe & Save and keep bath tissue on hand