Men shoes fashion CDD D557 sandal handy foot protection always dry, cool in summer days. The slimline sandal design, the CDD D557 net for men's fashionable design is made of high quality honeycomb mesh fabric with breathable holes for better air circulation in the shoe, double protection Your feet are always dry, cool in summer days.

The stitches are hand sewn regularly, neatly, beautiful design makes the line more concise and increase the certainty. CDD logo is cleverly attached to create a unique point. To match the hot summer weather, the inner surface of the CDD D557 uses a breathable, breathable mesh, breathable, antibacterial to help prevent sweat from the feet, protecting the feet from drying. , healthy. Peanut's surface is effective to massage, stimulate the pores to help regulate blood circulation efficiency, your health care. In addition, the high quality rubber sole, soft, multi-groove base increases friction, reduces slippery performance to feel safe for your feet.
- Lycra net has holes 360o airy to keep feet dry, odorless.
- Handmade stitching lines for regular shoe-length, definitely increase durability and aesthetics.
- Foot massage designed foot massage bean massage foot comfortably, smoothly, effectively prevent odor.
- Rubber feet with small grooves increase grip, anti-slip effect.
Brand: CDD
Material of base: Rubber
Design: Low soles
Korean style
Category: Casual