An extreme step up in color with a billion more shades than regular 4K UHD.
See extreme contrast between the darkest darks and the lightest lights, plus expanded color and depth.
See what you’ve been missing, even in dark scenes.
Enjoy smooth, crisp action, even in the fastest scenes, bringing sports and fast-moving content to life.
Please note the differences between the MU8000 and the MU800D. MU8000: Gray cabinet, 500 nits HDR sustained brightness, Mega Dynamic Contrast MU800D: Dark Titan cabinet, 470 nits HDR sustained brightness, Ultra Dynamic Contrast

Item Weight: 53.1 pounds
Product Dimensions: 56.9 x 11.4 x 36 inches
California residents: Proposition 65 warning
Item model number: UN65MU8000FXZA
Batteries: 2 AAA batteries required.
Color Name: black