L'Occitane Shower Oil Refill naturally cleanses skin without stripping it of its natural moisture barrier or leaving a greasy residue. Working into a gentle lather, this shower oil cleanses and hydrates your complexion. Formulated with a combination of almond oil, grape vine and rosemary, this unisex product may also be used for shaving.
Lotions and Oils: Body Oil
Bath and Shower: Bath Treatment
Ideal for these Concerns: Free Radical Damage
Ideal for these Skin Types: Oily Skin, Dry Skin, Combination Skin, Normal Skin, Sensitive Skin, Mature Skin, Acne-Prone Skin
Preferences: Clean
Key Ingredient(s): Antioxidants, Vitamin E
Application Area: Body