MVMT Chrono Gunmetal Black watch - 45mm with a powerful, impressive 6-needle design for modern gentlemen. Genuine import from US. Nationwide Ship!

Before stepping into the process of distinguishing real MVMT watches, you should always make sure that you are buying goods at a GENUINE, PRESTIGIOUS SALES PLACE with a proper authorization from the brand MVMT, which will ensure security. The highest full for the MVMT watch you buy that is not anything else.

Type: Japanese Miyota Precison Quartz
Display: 6 Hand Chronograph
Shell material: 316 Low Carbon Stainless Steel
Shell diameter: 45mm
Shell thickness: 12mm
Strap material: Genuine Leather (Genuine Leather)