Philips A19 Medium LED Light Bulb - Philips LED (light emitting diode) A19 light bulb with medium base. Ideal alternative to incandescent bulbs anywhere traditional light bulbs are used such as table or floor lamps, bedrooms, kitchens, and more. - Philips LED (light emitting diode) A19 light bulb with medium base. Ideal alternative to incandescent bulbs anywhere traditional light bulbs are used such as table or floor lamps, bedrooms, kitchens, and more.

Part Number: FBA_461145
Item Weight: 8 ounces
Product Dimensions: 6.8 x 4.6 x 2.6 inches
Item model number: VC0S2_461145
Color: Soft White
Shape: a19
Wattage: 40 watts