The Vicks Sweet Dreams™ Cool Mist Humidifier creates an enchanting and soothing bedtime environment for your child while providing temporary relief from cough and congestion.

Clear projection of scenes from 3 different dream inspired themes - Sea, Safari or Starry Night  - with 3 scenes per theme
Perfect for children of all ages
Ultra-quiet operation lets your child sleep soundly
More visible, dual scent pad slots for releasing soothing Vicks vapors
Easier to clean due to larger tank opening
Auto shut off when empty

Capacity:  3.8 liter/1.0 gallon
Warranty: 2 years limited
Room Size:  Small to Medium
Run Time:  Up to 24hrs
Colors:  Blue or Pink
Accessories:  Vicks VapoPads- VSP-19/ VSP1; Protec Demineralization cartridge - PDC51; Protec Cleaning Cartridge - PC-1C