It’s time to change the conversation about what happens in the bathroom. Introducing Cottonelle Ultra ComfortCare Mega Roll toilet tissue. There’s more than meets the eye with Cottonelle Ultra ComfortCare toilet paper with CleanRipple Texture to get you clean. With four rolls inside every Mega Roll,†† you can cut down on the bulk and still keep the ultimate, cushiony comfort of Cottonelle. That means 4 times less the hassle of changing the roll and buying more toilet paper.

CleanRipple Texture Gets You Cleaner
Your bath tissue should be soft, strong and get you clean. The CleanRipple Texture of Cottonelle Ultra ComfortCare toilet paper allows you to wipe with confidence for a fresh clean every time. With Cottonelle Mega Roll, you’re getting 4 times more soft and thick toilet paper in one roll. This bath tissue fits a standard toilet paper holder and with SafeFlush Technology, is safe for your sewer and septic system.

One Cottonelle Mega Roll is equal to four single rolls of the leading ultra 77-ct. toilet paper
Our softest, thickest, most absorbent Cottonelle Toilet Paper
Sewer-safe and septic-safe 2-ply bath tissue with CleanRipple Texture to remove more
Fits standard toilet paper holders without the need for any attachments
Save up to 15% on Cottonelle Ultra ComfortCare Toilet Paper with Subscribe & Save and keep bath tissue on hand