Men's Simpy 8120 suede side, surface made of high quality cowhide leather, light shade combined with modern technology, exquisite to bring luxury, attractive look, sides and heels. Made from suede material that impresses with a fresh, fancy look
- The surface uses high quality cowhide, light shade combined with modern technology, delicate to bring luxury, attractive look.
- The sides and sides of the heel are made of suede material to create an impressive point to bring fresh, strange look.
- The shiny metal piercing just makes it easier for you to wear, while also adorning fashion features for the product.
- Sturdy, meticulously threaded lines keep the product stable over long periods of time.
Brand: Simier
Gender: Male
Design: Round nose
Material: cowhide, suede
Processing technology: Khau
Material Technology: Soft Skin
Base Type: Stand
Material inside: Leather