Coffee-mate is America's #1 creamer that has an economical canister for Coffee-mate powdered creamer and dry creamer. This format creates an organized beverage station. Available in four popular flavors that are cholesterol-free, gluten-free, lactose-free, and contain Kosher dairy.
All of the classic and rich creamy flavor to whiten coffee beverages, now with 50% less fat than Original. With no refrigeration necessary and the longest shelf life at two years, Coffee-mate powdered creamer canisters have a unique flip top design for a convenient easy pour, helping the flow of traffic at your coffee station. This non-dairy creamer makes a perfect cup every time.

Sold as 12/Carton.
Lite, non-dairy powdered creamer.
Half the fat of regular non-dairy creamers.